<template>
  <div class="app-container">
    <el-form :model="queryParams" ref="queryForm" size="small" :inline="true" v-show="showSearch" label-width="100px">
      <el-form-item label="计量设备编号" prop="monitorCode">
        <el-input
          v-model="queryParams.monitorCode"
          placeholder="请输入计量设备编号"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="计量设备名称" prop="monitorName">
        <el-input
          v-model="queryParams.monitorName"
          placeholder="请输入计量设备名称"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="计量设备位置" prop="monitorAddr">
        <el-input
          v-model="queryParams.monitorAddr"
          placeholder="请输入计量设备位置"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="计量设备状态" prop="monitorStatus">
        <el-select v-model="queryParams.monitorStatus" placeholder="请选择计量设备状态" clearable>
          <el-option
            v-for="dict in dict.type.monitor_status"
            :key="dict.value"
            :label="dict.label"
            :value="dict.value"
          />
        </el-select>
      </el-form-item>
      <el-form-item label="采集设备编号" prop="collectDeviceId">
        <el-input
          v-model="queryParams.collectDeviceId"
          placeholder="请输入采集设备编号"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="是否虚拟" prop="isAmmeter">
        <el-select v-model="queryParams.isAmmeter" placeholder="请选择是否虚拟" clearable>
          <el-option
            v-for="dict in dict.type.is_ammeter"
            :key="dict.value"
            :label="dict.label"
            :value="dict.value"
          />
        </el-select>
      </el-form-item>
      <el-form-item>
        <el-button type="primary" icon="el-icon-search" size="mini" @click="handleQuery">搜索</el-button>
        <el-button icon="el-icon-refresh" size="mini" @click="resetQuery">重置</el-button>
      </el-form-item>
    </el-form>

    <el-row :gutter="10" class="mb8">
      <el-col :span="1.5">
        <el-button
          type="primary"
          plain
          icon="el-icon-plus"
          size="mini"
          @click="handleAdd"
          v-hasPermi="['ems/base:baseMonitorInfo:add']"
        >新增</el-button>
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="info"
          plain
          icon="el-icon-sort"
          size="mini"
          @click="toggleExpandAll"
        >展开/折叠</el-button>
      </el-col>
      <right-toolbar :showSearch.sync="showSearch" @queryTable="getList" :columns="columns"></right-toolbar>
    </el-row>

    <el-table
      v-if="refreshTable"
      v-loading="loading"
      :data="baseMonitorInfoList"
      row-key="objId"
      :default-expand-all="isExpandAll"
      :tree-props="{children: 'children', hasChildren: 'hasChildren'}"
    >
      <el-table-column label="父级编号" prop="parentId" v-if="columns[1].visible" />
      <el-table-column label="计量设备编号" align="center" prop="monitorCode" v-if="columns[2].visible" />
      <el-table-column label="计量设备名称" align="center" prop="monitorName" v-if="columns[3].visible" />
      <el-table-column label="计量设备位置" align="center" prop="monitorAddr" v-if="columns[4].visible" />
<!--      <el-table-column label="计量设备类型" align="center" prop="monitorType" v-if="columns[5].visible" />-->
      <el-table-column label="计量设备状态" align="center" prop="monitorStatus" v-if="columns[6].visible">
        <template slot-scope="scope">
          <dict-tag :options="dict.type.monitor_status" :value="scope.row.monitorStatus"/>
        </template>
      </el-table-column>
      <el-table-column label="采集设备编号" align="center" prop="collectDeviceId" v-if="columns[7].visible" />
      <el-table-column label="等级" align="center" prop="grade" v-if="columns[9].visible" />
      <el-table-column label="传感器仪表" align="center" prop="meterTypeId" v-if="columns[10].visible" />
      <el-table-column label="修正值" align="center" prop="correctValue" v-if="columns[11].visible" />
      <el-table-column label="是否虚拟" align="center" prop="isAmmeter" v-if="columns[14].visible">
        <template slot-scope="scope">
          <dict-tag :options="dict.type.is_ammeter" :value="scope.row.isAmmeter"/>
        </template>
      </el-table-column>
      <el-table-column label="通断复位" align="center" prop="isKeyMonitor" v-if="columns[15].visible" />
      <el-table-column label="是否断路" align="center" prop="isCircuit" v-if="columns[16].visible" />
      <el-table-column label="创建人" align="center" prop="createBy" v-if="columns[17].visible" />
      <el-table-column label="创建时间" align="center" prop="createTime" width="180" v-if="columns[18].visible">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.createTime, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column label="更新人" align="center" prop="updateBy" v-if="columns[19].visible" />
      <el-table-column label="更新时间" align="center" prop="updateTime" width="180" v-if="columns[20].visible">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.updateTime, '{y}-{m}-{d}') }}</span>
        </template>
      </el-table-column>
      <el-table-column label="公摊表类型" align="center" prop="publicShareType" v-if="columns[21].visible" />
      <el-table-column label="表具层级" align="center" prop="monitorHierarchy" v-if="columns[22].visible" />
      <el-table-column label="操作" align="center" class-name="small-padding fixed-width" width="180">
        <template slot-scope="scope">
          <el-button
            size="mini"
            type="text"
            icon="el-icon-edit"
            @click="handleUpdate(scope.row)"
            v-hasPermi="['ems/base:baseMonitorInfo:edit']"
          >修改</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-plus"
            @click="handleAdd(scope.row)"
            v-hasPermi="['ems/base:baseMonitorInfo:add']"
          >新增</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-delete"
            @click="handleDelete(scope.row)"
            v-hasPermi="['ems/base:baseMonitorInfo:remove']"
          >删除</el-button>
        </template>
      </el-table-column>
    </el-table>

    <!-- 添加或修改计量设备信息对话框 -->
    <el-dialog :title="title" :visible.sync="open" width="500px" append-to-body>
      <el-form ref="form" :model="form" :rules="rules" label-width="120px">
        <el-form-item label="父级编号" prop="parentId">
          <treeselect v-model="form.parentId" :options="baseMonitorInfoOptions" :normalizer="normalizer" placeholder="请选择父级编号" />
        </el-form-item>
        <el-form-item label="计量设备编号" prop="monitorCode">
          <el-input v-model="form.monitorCode" placeholder="请输入计量设备编号" />
        </el-form-item>
        <el-form-item label="计量设备名称" prop="monitorName">
          <el-input v-model="form.monitorName" placeholder="请输入计量设备名称" />
        </el-form-item>
        <el-form-item label="计量设备位置" prop="monitorAddr">
          <el-input v-model="form.monitorAddr" placeholder="请输入计量设备位置" />
        </el-form-item>
        <el-form-item label="计量设备状态" prop="monitorStatus">
          <el-radio-group v-model="form.monitorStatus">
            <el-radio
              v-for="dict in dict.type.monitor_status"
              :key="dict.value"
              :label="parseInt(dict.value)"
            >{{dict.label}}</el-radio>
          </el-radio-group>
        </el-form-item>
        <el-form-item label="采集设备编号" prop="collectDeviceId">
          <el-input v-model="form.collectDeviceId" placeholder="请输入采集设备编号" />
        </el-form-item>
        <el-form-item label="等级" prop="grade">
          <el-input v-model="form.grade" placeholder="请输入等级" />
        </el-form-item>
        <el-form-item label="传感器仪表" prop="meterTypeId">
          <el-input v-model="form.meterTypeId" placeholder="请输入传感器仪表" />
        </el-form-item>
        <el-form-item label="修正值" prop="correctValue">
          <el-input v-model="form.correctValue" placeholder="请输入修正值" />
        </el-form-item>
        <el-form-item label="是否虚拟" prop="isAmmeter">
          <el-radio-group v-model="form.isAmmeter">
            <el-radio
              v-for="dict in dict.type.is_ammeter"
              :key="dict.value"
              :label="dict.value"
            >{{dict.label}}</el-radio>
          </el-radio-group>
        </el-form-item>
        <el-form-item label="通断复位" prop="isKeyMonitor">
          <el-input v-model="form.isKeyMonitor" placeholder="请输入通断复位" />
        </el-form-item>
        <el-form-item label="是否断路" prop="isCircuit">
          <el-input v-model="form.isCircuit" placeholder="请输入是否断路" />
        </el-form-item>
        <el-form-item label="公摊表类型" prop="publicShareType">
          <el-input v-model="form.publicShareType" placeholder="请输入公摊表类型" />
        </el-form-item>
        <el-form-item label="表具层级" prop="monitorHierarchy">
          <el-input v-model="form.monitorHierarchy" placeholder="请输入表具层级" />
        </el-form-item>
      </el-form>
      <div slot="footer" class="dialog-footer">
        <el-button type="primary" @click="submitForm">确 定</el-button>
        <el-button @click="cancel">取 消</el-button>
      </div>
    </el-dialog>
  </div>
</template>

<script>
import { listBaseMonitorInfo, getBaseMonitorInfo, delBaseMonitorInfo, addBaseMonitorInfo, updateBaseMonitorInfo } from "@/api/ems/base/baseMonitorInfo";
import Treeselect from "@riophae/vue-treeselect";
import "@riophae/vue-treeselect/dist/vue-treeselect.css";

export default {
  name: "BaseMonitorInfo",
  dicts: ['is_ammeter', 'monitor_status'],
  components: {
    Treeselect
  },
  data() {
    return {
      // 遮罩层
      loading: true,
      // 显示搜索条件
      showSearch: true,
      // 计量设备信息表格数据
      baseMonitorInfoList: [],
      // 计量设备信息树选项
      baseMonitorInfoOptions: [],
      // 弹出层标题
      title: "",
      // 是否显示弹出层
      open: false,
      // 是否展开，默认全部展开
      isExpandAll: true,
      // 重新渲染表格状态
      refreshTable: true,
      // 查询参数
      queryParams: {
        parentId: null,
        monitorCode: null,
        monitorName: null,
        monitorAddr: null,
        monitorType: 3,
        monitorStatus: null,
        collectDeviceId: null,
        ancestors: null,
        grade: null,
        meterTypeId: null,
        correctValue: null,
        pt: null,
        ct: null,
        isAmmeter: null,
        isKeyMonitor: null,
        isCircuit: null,
        createBy: null,
        createTime: null,
        updateBy: null,
        updateTime: null,
        publicShareType: null,
        monitorHierarchy: null
      },
      // 表单参数
      form: {},
      // 表单校验
      rules: {
        objId: [
          { required: true, message: "自增标识不能为空", trigger: "blur" }
        ],
        monitorCode: [
          { required: true, message: "计量设备编号不能为空", trigger: "blur" }
        ],
      },
      columns: [
        {key: 0, label: `自增标识`, visible: false},
        {key: 1, label: `父级编号`, visible: false},
        {key: 2, label: `计量设备编号`, visible: true},
        {key: 3, label: `计量设备名称`, visible: true},
        {key: 4, label: `计量设备位置`, visible: true},
        {key: 5, label: `计量设备类型`, visible: true},
        {key: 6, label: `计量设备状态`, visible: true},
        {key: 7, label: `采集设备编号`, visible: true},
        {key: 8, label: `祖级列表`, visible: true},
        {key: 9, label: `等级`, visible: false},
        {key: 10, label: `传感器仪表`, visible: false},
        {key: 11, label: `修正值`, visible: false},
        {key: 12, label: `PT值`, visible: true},
        {key: 13, label: `CT值`, visible: true},
        {key: 14, label: `是否虚拟`, visible: true},
        {key: 15, label: `通断复位`, visible: false},
        {key: 16, label: `是否断路`, visible: false},
        {key: 17, label: `创建人`, visible: false},
        {key: 18, label: `创建时间`, visible: false},
        {key: 19, label: `更新人`, visible: false},
        {key: 20, label: `更新时间`, visible: false},
        {key: 21, label: `公摊表类型`, visible: false},
        {key: 22, label: `表具层级`, visible: false},
      ]
    };
  },
  created() {
    this.getList();
  },
  methods: {
    /** 查询计量设备信息列表 */
    getList() {
      this.loading = true;
      listBaseMonitorInfo(this.queryParams).then(response => {
        this.baseMonitorInfoList = this.handleTree(response.data, "objId", "parentId");
        this.loading = false;
      });
    },
    /** 转换计量设备信息数据结构 */
    normalizer(node) {
      if (node.children && !node.children.length) {
        delete node.children;
      }
      return {
        id: node.objId,
        label: node.monitorName,
        children: node.children
      };
    },
    /** 查询计量设备信息下拉树结构 */
    getTreeselect() {
      listBaseMonitorInfo().then(response => {
        this.baseMonitorInfoOptions = [];
        const data = { objId: 0, monitorName: '顶级节点', children: [] };
        data.children = this.handleTree(response.data, "objId", "parentId");
        this.baseMonitorInfoOptions.push(data);
      });
    },
    // 取消按钮
    cancel() {
      this.open = false;
      this.reset();
    },
    // 表单重置
    reset() {
      this.form = {
        objId: null,
        parentId: null,
        monitorCode: null,
        monitorName: null,
        monitorAddr: null,
        monitorType: 3,
        monitorStatus: null,
        collectDeviceId: null,
        ancestors: null,
        grade: null,
        meterTypeId: null,
        correctValue: null,
        pt: null,
        ct: null,
        isAmmeter: null,
        isKeyMonitor: null,
        isCircuit: null,
        createBy: null,
        createTime: null,
        updateBy: null,
        updateTime: null,
        publicShareType: null,
        monitorHierarchy: null
      };
      this.resetForm("form");
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.getList();
    },
    /** 重置按钮操作 */
    resetQuery() {
      this.resetForm("queryForm");
      this.handleQuery();
    },
    /** 新增按钮操作 */
    handleAdd(row) {
      this.reset();
      this.getTreeselect();
      if (row != null && row.objId) {
        this.form.parentId = row.objId;
      } else {
        this.form.parentId = 0;
      }
      this.open = true;
      this.title = "添加计量设备信息";
    },
    /** 展开/折叠操作 */
    toggleExpandAll() {
      this.refreshTable = false;
      this.isExpandAll = !this.isExpandAll;
      this.$nextTick(() => {
        this.refreshTable = true;
      });
    },
    /** 修改按钮操作 */
    handleUpdate(row) {
      this.reset();
      this.getTreeselect();
      if (row != null) {
        this.form.parentId = row.parentId;
      }
      getBaseMonitorInfo(row.objId).then(response => {
        this.form = response.data;
        this.open = true;
        this.title = "修改计量设备信息";
      });
    },
    /** 提交按钮 */
    submitForm() {
      this.$refs["form"].validate(valid => {
        if (valid) {
          if (this.form.objId != null) {
            updateBaseMonitorInfo(this.form).then(response => {
              this.$modal.msgSuccess("修改成功");
              this.open = false;
              this.getList();
            });
          } else {
            // this.form.monitorType = 3;
            addBaseMonitorInfo(this.form).then(response => {
              this.$modal.msgSuccess("新增成功");
              this.open = false;
              this.getList();
            });
          }
        }
      });
    },
    /** 删除按钮操作 */
    handleDelete(row) {
      this.$modal.confirm('是否确认删除计量设备信息编号为"' + row.objId + '"的数据项？').then(function() {
        return delBaseMonitorInfo(row.objId);
      }).then(() => {
        this.getList();
        this.$modal.msgSuccess("删除成功");
      }).catch(() => {});
    }
  }
};
</script>
