<template>
  <div class="p-2">
    <transition :enter-active-class="proxy?.animate.searchAnimate.enter" :leave-active-class="proxy?.animate.searchAnimate.leave">
      <div v-show="showSearch" class="mb-[10px]">
        <el-card shadow="hover">
          <el-form ref="queryFormRef" :model="queryParams" :inline="true" label-width='120px'>
            <!-- <el-form-item label="检测项主键" prop="itemId">
              <el-input v-model="queryParams.itemId" placeholder="请输入检测项主键" clearable @keyup.enter="handleQuery" />
            </el-form-item> -->
            <el-form-item label="检测项编码" prop="itemCode">
              <el-input v-model="queryParams.itemCode" placeholder="请输入检测项编码" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="检测项名称" prop="itemName">
              <el-input v-model="queryParams.itemName" placeholder="请输入检测项名称" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <!-- <el-form-item label="检测位置" prop="inspectionPosition">
              <el-input v-model="queryParams.inspectionPosition" placeholder="请输入检测位置" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="检测项类别" prop="categoryId">
              <el-input v-model="queryParams.categoryId" placeholder="请输入检测项类别" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="检测类型" prop="inspectionType">
              <el-input v-model="queryParams.inspectionType" placeholder="请输入检测类型" clearable @keyup.enter="handleQuery" />
            </el-form-item> -->
            <el-form-item label="检测方法" prop="method">
              <el-select v-model="queryParams.method" placeholder="请选择检测方法" clearable >
                <el-option v-for="dict in qc_methond" :key="dict.value" :label="dict.label" :value="dict.value"/>
              </el-select>
            </el-form-item>
            <el-form-item label="检测方式" prop="detectType">
              <el-select v-model="queryParams.detectType" placeholder="请选择检测方式" clearable >
                <el-option v-for="dict in detect_type" :key="dict.value" :label="dict.label" :value="dict.value"/>
              </el-select>
            </el-form-item>
            <el-form-item label="控制类型" prop="controlType">
              <el-select v-model="queryParams.controlType" placeholder="请选择控制类型" clearable >
                <el-option v-for="dict in control_type" :key="dict.value" :label="dict.label" :value="dict.value"/>
              </el-select>
            </el-form-item>
            <!-- <el-form-item label="标准值" prop="standardValue">
              <el-input v-model="queryParams.standardValue" placeholder="请输入标准值" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="控制上限" prop="upperLimit">
              <el-input v-model="queryParams.upperLimit" placeholder="请输入控制上限" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="控制下限" prop="lowerLimit">
              <el-input v-model="queryParams.lowerLimit" placeholder="请输入控制下限" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="规格名称" prop="specName">
              <el-input v-model="queryParams.specName" placeholder="请输入规格名称" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="规格上限" prop="specUpper">
              <el-input v-model="queryParams.specUpper" placeholder="请输入规格上限" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="规格下限" prop="specLower">
              <el-input v-model="queryParams.specLower" placeholder="请输入规格下限" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="检测项说明" prop="description">
              <el-input v-model="queryParams.description" placeholder="请输入检测项说明" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="检测选项编码" prop="optionCode">
              <el-input v-model="queryParams.optionCode" placeholder="请输入检测选项编码" clearable @keyup.enter="handleQuery" />
            </el-form-item>
            <el-form-item label="检测选项名称" prop="optionName">
              <el-input v-model="queryParams.optionName" placeholder="请输入检测选项名称" clearable @keyup.enter="handleQuery" />
            </el-form-item> -->
            <el-form-item label="是否默认选项" prop="isDefault">
              <el-select v-model="queryParams.isDefault" placeholder="请选择是否默认选项" clearable >
                <el-option v-for="dict in is_default" :key="dict.value" :label="dict.label" :value="dict.value"/>
              </el-select>
            </el-form-item>
            <el-form-item>
              <el-button type="primary" icon="Search" @click="handleQuery">搜索</el-button>
              <el-button icon="Refresh" @click="resetQuery">重置</el-button>
            </el-form-item>
          </el-form>
        </el-card>
      </div>
    </transition>

    <el-card shadow="never">
      <template #header>
        <el-row :gutter="10" class="mb8">
          <el-col :span="1.5">
            <el-button type="primary" plain icon="Plus" @click="handleAdd" v-hasPermi="['qms:qcInspectionItem:add']">新增</el-button>
          </el-col>
          <el-col :span="1.5">
            <el-button type="success" plain icon="Edit" :disabled="single" @click="handleUpdate()" v-hasPermi="['qms:qcInspectionItem:edit']">修改</el-button>
          </el-col>
          <el-col :span="1.5">
            <el-button type="danger" plain icon="Delete" :disabled="multiple" @click="handleDelete()" v-hasPermi="['qms:qcInspectionItem:remove']">删除</el-button>
          </el-col>
          <el-col :span="1.5">
            <el-button type="warning" plain icon="Download" @click="handleExport" v-hasPermi="['qms:qcInspectionItem:export']">导出</el-button>
          </el-col>
          <el-col :span="1.5">
            <el-button type="warning" plain icon="Download" @click="handleExportTemplate" v-hasPermi="['qms:qcInspectionItem:export']">导出模板</el-button>
          </el-col>
          <el-col :span="1.5">
            <el-button type="primary" plain icon="Upload" @click="handleImport" v-hasPermi="['qms:qcInspectionItem:add']">导入</el-button>
          </el-col>
          <right-toolbar v-model:showSearch="showSearch" :columns="columns" :search="true" @queryTable="getList"></right-toolbar>
        </el-row>
      </template>

      <el-table v-loading="loading" :data="qcInspectionItemList" @selection-change="handleSelectionChange">
        <el-table-column type="selection" width="55" align="center" />
        <!-- <el-table-column label="检测项主键" align="center" prop="itemId" v-if="columns[0].visible"/> -->
        <el-table-column label="序号" type="index" width="50" align="center"  v-if="columns[0].visible"/>
        <el-table-column label="检测项编码" align="center" prop="itemCode" v-if="columns[1].visible"/>
        <el-table-column label="检测项名称" align="center" prop="itemName" v-if="columns[2].visible"/>
        <el-table-column label="检测位置" align="center" prop="inspectionPosition" v-if="columns[3].visible"/>
        <el-table-column label="检测类型" align="center" prop="typeName" v-if="columns[4].visible"/>
        <el-table-column label="检测项类别" align="center" prop="categoryName" v-if="columns[5].visible"/>
        <el-table-column label="检测方法" align="center" prop="method" v-if="columns[6].visible">
          <template #default="scope">
            <dict-tag :options="qc_methond" :value="scope.row.method"/>
          </template>
        </el-table-column>
        <el-table-column label="检测方式" align="center" prop="detectType" v-if="columns[7].visible">
          <template #default="scope">
            <dict-tag :options="detect_type" :value="scope.row.detectType"/>
          </template>
        </el-table-column>
        <el-table-column label="控制类型" align="center" prop="controlType" v-if="columns[8].visible">
          <template #default="scope">
            <dict-tag :options="control_type" :value="scope.row.controlType"/>
          </template>
        </el-table-column>
        <el-table-column label="标准值" align="center" prop="standardValue" v-if="columns[9].visible"/>
        <el-table-column label="控制上限" align="center" prop="upperLimit" v-if="columns[10].visible"/>
        <el-table-column label="控制下限" align="center" prop="lowerLimit" v-if="columns[11].visible"/>
        <el-table-column label="规格名称" align="center" prop="specName" v-if="columns[12].visible"/>
        <el-table-column label="规格上限" align="center" prop="specUpper" v-if="columns[13].visible"/>
        <el-table-column label="规格下限" align="center" prop="specLower" v-if="columns[14].visible"/>
        <el-table-column label="检测项说明" align="center" prop="description" v-if="columns[15].visible"/>
        <el-table-column label="检测选项编码" align="center" prop="optionCode" v-if="columns[16].visible"/>
        <el-table-column label="检测选项名称" align="center" prop="optionName" v-if="columns[17].visible"/>
        <el-table-column label="是否默认选项" align="center" prop="isDefault" v-if="columns[18].visible">
          <template #default="scope">
            <dict-tag :options="is_default" :value="scope.row.isDefault"/>
          </template>
        </el-table-column>
        <el-table-column label="操作" align="center" class-name="small-padding fixed-width">
          <template #default="scope">
            <el-tooltip content="修改" placement="top">
              <el-button link type="primary" icon="Edit" @click="handleUpdate(scope.row)" v-hasPermi="['qms:qcInspectionItem:edit']"></el-button>
            </el-tooltip>
            <el-tooltip content="删除" placement="top">
              <el-button link type="primary" icon="Delete" @click="handleDelete(scope.row)" v-hasPermi="['qms:qcInspectionItem:remove']"></el-button>
            </el-tooltip>
          </template>
        </el-table-column>
      </el-table>

      <pagination v-show="total > 0" :total="total" v-model:page="queryParams.pageNum" v-model:limit="queryParams.pageSize" @pagination="getList" />
    </el-card>

    <!-- 添加或修改检测项定义对话框 -->
    <el-dialog :title="dialog.title" v-model="dialog.visible" width="1200px" append-to-body>
      <el-form ref="qcInspectionItemFormRef" :model="form" :rules="rules" label-width="120px">
        <el-row>
          <el-col :span="6">
            <el-form-item label="检测项编码" prop="itemCode">
              <el-input v-model="form.itemCode" placeholder="请输入检测项编码" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="检测项名称" prop="itemName">
              <el-input v-model="form.itemName" placeholder="请输入检测项名称" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="检测方式" prop="detectType">
              <el-select v-model="form.detectType" placeholder="请选择检测方式" :disabled="!!form.itemId">
                <el-option v-for="dict in detect_type" :key="dict.value" :label="dict.label" :value="parseInt(dict.value)"></el-option>
              </el-select>
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="控制类型" prop="controlType">
              <el-select v-model="form.controlType" placeholder="请选择控制类型">
                <el-option v-for="dict in control_type" :key="dict.value" :label="dict.label" :value="parseInt(dict.value)"></el-option>
              </el-select>
            </el-form-item>
          </el-col>
        </el-row>

        <el-row>
          <el-col :span="6">
            <el-form-item label="检测类型" prop="inspectionType">
              <el-select v-model="form.inspectionType" placeholder="请选择检测类型">
                <el-option v-for="item in qcInspectionTypeList" :key="item.typeId" :label="item.typeName" :value="item.typeId" />
              </el-select>
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="检测项类别" prop="categoryId">
              <el-select v-model="form.categoryId" placeholder="请选择检测项类别">
                <el-option v-for="item in filteredCategories" :key="item.categoryId" :label="item.categoryName" :value="item.categoryId" />
              </el-select>
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="检测方法" prop="method">
              <el-select v-model="form.method" placeholder="请选择检测方法">
                <el-option v-for="dict in qc_methond" :key="dict.value" :label="dict.label" :value="parseInt(dict.value)"></el-option>
              </el-select>
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="规格名称" prop="specName">
              <el-input v-model="form.specName" placeholder="请输入规格名称" />
            </el-form-item>
          </el-col>
        </el-row>

        <el-row v-if="form.detectType === 1">
          <el-col :span="6">
            <el-form-item label="标准值" prop="standardValue">
              <el-input-number v-model="form.standardValue" placeholder="请输入标准值" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="控制上限" prop="upperLimit">
              <el-input-number v-model="form.upperLimit" placeholder="请输入控制上限" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="控制下限" prop="lowerLimit">
              <el-input-number v-model="form.lowerLimit" placeholder="请输入控制下限" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="规格上限" prop="specUpper">
              <el-input-number v-model="form.specUpper" placeholder="请输入规格上限" />
            </el-form-item>
          </el-col>
        </el-row>

        <el-row v-if="form.detectType === 1">
          <el-col :span="6">
            <el-form-item label="规格下限" prop="specLower">
              <el-input-number v-model="form.specLower" placeholder="请输入规格下限" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="检测位置" prop="inspectionPosition">
              <el-input v-model="form.inspectionPosition" placeholder="请输入检测位置" />
            </el-form-item>
          </el-col>
        </el-row>
        <el-row v-else>
          <el-col :span="6">
            <el-form-item label="检测位置" prop="inspectionPosition">
              <el-input v-model="form.inspectionPosition" placeholder="请输入检测位置" />
            </el-form-item>
          </el-col>
        </el-row>
        <el-row>
          <el-col :span="24">
            <el-form-item label="检测项说明" prop="description">
              <el-input type="textarea" v-model="form.description" placeholder="请输入检测项说明" />
            </el-form-item>
          </el-col>
        </el-row>

        <el-row span="24">
          <el-col :span="6">
            <el-form-item label="检测选项编码" prop="optionCode">
              <el-input v-model="form.optionCode" placeholder="请输入检测选项编码" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="检测选项名称" prop="optionName">
              <el-input v-model="form.optionName" placeholder="请输入检测选项名称" />
            </el-form-item>
          </el-col>
          <el-col :span="6">
            <el-form-item label="是否默认选项" prop="isDefault">
              <el-select v-model="form.isDefault" placeholder="请选择是否默认选项">
                <el-option v-for="dict in is_default" :key="dict.value" :label="dict.label" :value="dict.value"></el-option>
              </el-select>
            </el-form-item>
          </el-col>
        </el-row>
      </el-form>
      <template #footer>
        <div class="dialog-footer">
          <el-button :loading="buttonLoading" type="primary" @click="submitForm">确 定</el-button>
          <el-button @click="cancel">取 消</el-button>
        </div>
      </template>
    </el-dialog>
    <input ref="fileInput" type="file" accept=".xlsx, .xls" style="display: none" @change="onFileChange" />
  </div>
</template>

<script setup name="QcInspectionItem" lang="ts">
import { listQcInspectionItem, getQcInspectionItem, delQcInspectionItem, addQcInspectionItem, updateQcInspectionItem, getQcInspectionItemList, importData } from '@/api/qms/qcInspectionItem';
import { QcInspectionItemVO, QcInspectionItemQuery, QcInspectionItemForm } from '@/api/qms/qcInspectionItem/types';
import { getQcInspectionItemCategoryList } from '@/api/qms/qcInspectionItemCategory';
import { QcInspectionItemCategoryVO } from '@/api/qms/qcInspectionItemCategory/types';
import { getQcInspectionTypeList } from '@/api/qms/qcInspectionType';
import { QcInspectionTypeVO } from '@/api/qms/qcInspectionType/types';
import { computed } from 'vue';

const { proxy } = getCurrentInstance() as ComponentInternalInstance;
const { qc_methond, detect_type, control_type, is_default } = toRefs<any>(proxy?.useDict('qc_methond', 'detect_type', 'control_type', 'is_default'));

const qcInspectionItemList = ref<QcInspectionItemVO[]>([]);
const buttonLoading = ref(false);
const loading = ref(true);
const showSearch = ref(true);
const ids = ref<Array<string | number>>([]);
const single = ref(true);
const multiple = ref(true);
const total = ref(0);


const queryFormRef = ref<ElFormInstance>();
const qcInspectionItemFormRef = ref<ElFormInstance>();

const dialog = reactive<DialogOption>({
  visible: false,
  title: ''
});

// 列显隐信息
const columns = ref<FieldOption[]>([
        // { key: 0, label: `检测项主键`, visible: true },
        { key: 0, label: `序号`, visible: true },
        { key: 1, label: `检测项编码`, visible: true },
        { key: 2, label: `检测项名称`, visible: true },
        { key: 3, label: `检测位置`, visible: true },
        { key: 4, label: `检测类型`, visible: true },
        { key: 5, label: `检测项类别`, visible: true },
        { key: 6, label: `检测方法`, visible: true },
        { key: 7, label: `检测方式`, visible: true },
        { key: 8, label: `控制类型`, visible: true },
        { key: 9, label: `标准值`, visible: true },
        { key: 10, label: `控制上限`, visible: true },
        { key: 11, label: `控制下限`, visible: true },
        { key: 12, label: `规格名称`, visible: true },
        { key: 13, label: `规格上限`, visible: true },
        { key: 14, label: `规格下限`, visible: true },
        { key: 15, label: `检测项说明`, visible: true },
        { key: 16, label: `检测选项编码`, visible: true },
        { key: 17, label: `检测选项名称`, visible: true },
        { key: 18, label: `是否默认选项`, visible: true },
        // { key: 20, label: `创建人`, visible: true },
        // { key: 21, label: `创建部门`, visible: true },
        // { key: 22, label: `创建时间`, visible: true },
        // { key: 23, label: `修改人`, visible: true },
        // { key: 24, label: `修改时间`, visible: true },
]);

const initFormData: QcInspectionItemForm = {
  itemId: undefined,
  itemCode: undefined,
  itemName: undefined,
  inspectionPosition: undefined,
  categoryId: undefined,
  inspectionType: undefined,
  method: undefined,
  detectType: undefined,
  controlType: undefined,
  standardValue: undefined,
  upperLimit: undefined,
  lowerLimit: undefined,
  specName: undefined,
  specUpper: undefined,
  specLower: undefined,
  description: undefined,
  optionCode: undefined,
  optionName: undefined,
  isDefault: undefined,
}
const data = reactive<PageData<QcInspectionItemForm, QcInspectionItemQuery>>({
  form: {...initFormData},
  queryParams: {
    pageNum: 1,
    pageSize: 10,
    itemId: undefined,
    itemCode: undefined,
    itemName: undefined,
    inspectionPosition: undefined,
    categoryId: undefined,
    inspectionType: undefined,
    method: undefined,
    detectType: undefined,
    controlType: undefined,
    standardValue: undefined,
    upperLimit: undefined,
    lowerLimit: undefined,
    specName: undefined,
    specUpper: undefined,
    specLower: undefined,
    description: undefined,
    optionCode: undefined,
    optionName: undefined,
    isDefault: undefined,
    params: {
    }
  },
  rules: {
    itemId: [
      { required: true, message: "检测项主键不能为空", trigger: "blur" }
    ],
  }
});

const { queryParams, form, rules } = toRefs(data);

/** 查询检测项定义列表 */
const getList = async () => {
  loading.value = true;
  const res = await listQcInspectionItem(queryParams.value);
  qcInspectionItemList.value = res.rows;
  total.value = res.total;
  loading.value = false;
}

/** 取消按钮 */
const cancel = () => {
  reset();
  dialog.visible = false;
}

/** 表单重置 */
const reset = () => {
  form.value = {...initFormData};
  qcInspectionItemFormRef.value?.resetFields();
}

/** 搜索按钮操作 */
const handleQuery = () => {
  queryParams.value.pageNum = 1;
  getList();
}

/** 重置按钮操作 */
const resetQuery = () => {
  queryFormRef.value?.resetFields();
  handleQuery();
}

/** 多选框选中数据 */
const handleSelectionChange = (selection: QcInspectionItemVO[]) => {
  ids.value = selection.map(item => item.itemId);
  single.value = selection.length != 1;
  multiple.value = !selection.length;
}

/** 新增按钮操作 */
const handleAdd = () => {
  reset();
  dialog.visible = true;
  dialog.title = "添加检测项定义";
}

/** 修改按钮操作 */
const handleUpdate = async (row?: QcInspectionItemVO) => {
  reset();
  const _itemId = row?.itemId || ids.value[0]
  const res = await getQcInspectionItem(_itemId);
  Object.assign(form.value, res.data);
  dialog.visible = true;
  dialog.title = "修改检测项定义";
}

/** 提交按钮 */
const submitForm = () => {
  qcInspectionItemFormRef.value?.validate(async (valid: boolean) => {
    if (valid) {
      buttonLoading.value = true;
      if (form.value.itemId) {
        await updateQcInspectionItem(form.value).finally(() =>  buttonLoading.value = false);
      } else {
        await addQcInspectionItem(form.value).finally(() =>  buttonLoading.value = false);
      }
      proxy?.$modal.msgSuccess("操作成功");
      dialog.visible = false;
      await getList();
    }
  });
}

/** 删除按钮操作 */
const handleDelete = async (row?: QcInspectionItemVO) => {
  const _itemIds = row?.itemId || ids.value;
  await proxy?.$modal.confirm('是否确认删除检测项定义编号为"' + _itemIds + '"的数据项？').finally(() => loading.value = false);
  await delQcInspectionItem(_itemIds);
  proxy?.$modal.msgSuccess("删除成功");
  await getList();
}

/** 导出按钮操作 */
const handleExport = () => {
  proxy?.download('qms/qcInspectionItem/export', {
    ...queryParams.value
  }, `qcInspectionItem_${new Date().getTime()}.xlsx`)
}

/** 导出模板按钮操作 */
const handleExportTemplate = () => {
  proxy?.download('qms/qcInspectionItem/exportTemplate', {

  }, `qcInspectionItem_template_${new Date().getTime()}.xlsx`)
}

/** 查询检测项类别列表 */
let qcInspectionItemCategoryList = ref([]);
const getCategoryList = async () => {
  const res = await getQcInspectionItemCategoryList(null);
  qcInspectionItemCategoryList.value = res.data;
};

/** 查询检测类型列表 */
let qcInspectionTypeList = ref([]);
const getTypeList = async () => {
  const res = await getQcInspectionTypeList(null);
  qcInspectionTypeList.value = res.data;
};

/** 导入按钮操作 */
const fileInput = ref<HTMLInputElement>();
const uploading = ref(false);
const handleImport = () => {
  fileInput.value?.click();
}
const onFileChange = async (event: Event) => {
  const input = event.target as HTMLInputElement;
  if (input.files && input.files.length > 0) {
    const file = input.files[0];
    uploading.value = true;
    try {
      await importData(file, true);
      proxy?.$modal.msgSuccess("导入成功");
      await getList();
    } catch (err) {
      proxy?.$modal.msgError("导入失败");
      console.error(err);
    } finally {
      uploading.value = false;
      input.value = '';
    }
  }
}

// 需先选择检测类型，检测项类别下拉列表将自动过滤为匹配该类型(typeId)的选项
const flattenCategories = (categories: QcInspectionItemCategoryVO[]): QcInspectionItemCategoryVO[] => {
  let result: QcInspectionItemCategoryVO[] = [];
  categories.forEach(cat => {
    result.push({ ...cat, children: undefined });
    if (cat.children && cat.children.length > 0) {
      result = result.concat(flattenCategories(cat.children));
    }
  });
  return result;
};

const allFlatCategories = computed(() => flattenCategories(qcInspectionItemCategoryList.value));

const filteredCategories = computed(() => {
  if (!form.value.inspectionType) return [];
  return allFlatCategories.value.filter(item => item.typeId === form.value.inspectionType);
});

onMounted(() => {
  getList();
  getCategoryList();
  getTypeList();
});
</script>
