<template>
  <div>
    <TitleGroup>
      <template slot="title">TECHNICAL ARCHITECTURE</template>
      <template slot="subTitle">技术架构</template>
    </TitleGroup>
    <div class="pageInfo">针对变配电场景下高压场/GIS组合电器、变压器、电容电抗蛋、避雷器、高压开关柜、隔离开关等电气设备采用不同的手段进行监测。</div>
    <div class="image">
      <el-image
        style="width: 100%;height: 100%"
        :src="banner"
        ></el-image>
<!--        fit="contain"></el-image>-->
    </div>
  </div>
</template>

<script>
import TitleGroup from "@/components/TitleGroup";
import banner from '@/assets/image/banner.png'

let map = null
export default {
  name: 'PlatformArchitecture',
  components: {
    TitleGroup
  },
  data() {
    return {
      banner,
    }
  },
  mounted() {
  },
  methods: {}
}
</script>

<style lang="less" scoped>
@import "~@/style.less";
.image{
  width: 65vw;
  height: 33.3vw;
  display: inline-block;
  margin: 4vw 0 6vw 0;
}
.pageInfo{
  width: 63vw;
  margin-top: 0.9vw;
  display: inline-block;
  color: #6666;
  font-size: 1.2vw;
  line-height: 2.2vw;
  letter-spacing: 2.8px;
}
</style>
