<template>
  <div class="app-container">
    <el-form :model="queryParams" ref="queryForm" size="small" :inline="true" v-show="showSearch" label-width="68px">

      <el-form-item label="产线编码" prop="lineCode">
        <el-input
          v-model="queryParams.workorderName"
          placeholder="请输入产线编码"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="产线名称" prop="lineName">
        <el-input
          v-model="queryParams.equipmentName"
          placeholder="请输入产线名称"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>

      <el-form-item label="电表编号" prop="electricityNo">
        <el-input
          v-model="queryParams.electricityNo"
          placeholder="请输入电表编号"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>


      <el-form-item label="订单生产日期"  label-width="100px">
        <el-date-picker
          v-model="dateRange"
          style="width: 240px"
          value-format="yyyy-MM-dd"
          type="daterange"
          range-separator="-"
          start-placeholder="开始日期"
          end-placeholder="结束日期"
        ></el-date-picker>
      </el-form-item>

      <el-form-item>
        <el-button type="primary" icon="el-icon-search" size="mini" @click="handleQuery">搜索</el-button>
        <el-button icon="el-icon-refresh" size="mini" @click="resetQuery">重置</el-button>
      </el-form-item>
    </el-form>

    <el-row :gutter="10" class="mb8">

      <el-col :span="1.5">
        <el-button
          type="warning"
          plain
          icon="el-icon-download"
          size="mini"
          @click="handleExport"
          v-hasPermi="['energy:orderenergy:export']"
        >导出</el-button>
      </el-col>
      <right-toolbar :showSearch.sync="showSearch" @queryTable="getList"></right-toolbar>
    </el-row>

    <el-table v-loading="loading" :data="OrderEnergyList" @selection-change="handleSelectionChange">
      <el-table-column type="selection" width="55" align="center" />
      <el-table-column label="订单号" align="center"  prop="workorderCode" />
      <el-table-column label="产线编码" align="center" width="100" prop="workorderName" />
      <el-table-column label="产线名称" align="center" width="150"prop="equipmentName" />
      <el-table-column label="生产日期" align="center" width="150"prop="productDate" />
      <el-table-column label="电表编号" align="center" prop="electricityNo" />
      <el-table-column label="产品编码" align="center" width="200" prop="productCode" />
      <el-table-column label="产品描述" align="center"  width="300" prop="productName" />
      <el-table-column label="生产数量（箱）" align="center" prop="totalQuantityFeedback" />
      <el-table-column label="开始值" align="center" prop="startKW" />
      <el-table-column label="结束值" align="center" prop="endKW" />
      <el-table-column label="倍率" align="center" prop="multiplier" />
      <el-table-column label="能耗（KW·h）" align="center" prop="kw" />
    </el-table>

    <pagination
      v-show="total>0"
      :total="total"
      :page.sync="queryParams.pageNum"
      :limit.sync="queryParams.pageSize"
      @pagination="getList"
    />

  </div>
</template>

<script>
import { getToken } from "@/utils/auth";
import { listOrderEnergy} from "@/api/energy/powerUse/OrderEnergy";
import { getProductByCode} from "@/api/wms/product";
import { listChildprocessall} from "@/api/mes/childprocess";
export default {
  name: "OrderEnergy",
  data() {
    return {
      // 遮罩层
      loading: true,
      // 选中数组
      ids: [],
      // 非单个禁用
      single: true,
      // 非多个禁用
      multiple: true,
      // 显示搜索条件
      showSearch: true,
      // 总条数
      total: 0,
      //表格数据
      OrderEnergyList: [],
      // 弹出层标题
      title: "",
      // 是否显示弹出层
      open: false,
      // 日期范围
      dateRange: [],
      value: '',
      upload: {
        loading: false,
        // 是否显示弹出层（用户导入）
        open: false,
        // 弹出层标题（用户导入）
        title: "",
        // 是否禁用上传
        isUploading: false,
        // 是否更新已经存在的用户数据
        updateSupport: 0,
        // 设置上传的请求头部
        headers: {poolName: localStorage.getItem("USER_POOL_NAME_CURRENT"), Authorization: "Bearer " + getToken()},
        // 上传的地址
        url: process.env.VUE_APP_BASE_API + "/mes/unitPrice/importData"
      },
      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize: 10,
        factoryId: null,
        productCode: null,
        productName: null,
        workorderName: null,
        equipmentName: null,
        electricityNo: null,
        attr1: null,
        attr2: null,
        attr3: null,
        attr4: null,
      },
      productQueryParams:{
        productCode: null,
        productName: null,
      },
      // 表单参数
      form: {},
      // 表单校验
      rules: {
        productCode: [
          { required: true, message: "产品编码不能为空", trigger: "blur" },
        ],
        lineName: [
          { required: true, message: "产线不能为空", trigger: "blur" },
        ],
        attr1: [
          { required: true, message: "单价不能为空", trigger: "blur" },
        ],
      },
      productCodeList: [],
      state: '',
      timeout:  null,
      productCode:'',
      tableData: [],
      processOptions: [
        { value: 'Process 1', label: '工序1' },
        { value: 'Process 2', label: '工序2' },
      ],
      nextID: 1,
      inputType: 'text'
    };
  },
  created() {
    this.getList();
    // this.fetchProcessOptions();
  },
  methods: {

    /** 查询unitPrice列表 */
    getList() {
      this.loading = true;
      listOrderEnergy(this.addDateRange(this.queryParams, this.dateRange)).then(response => {
        this.OrderEnergyList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
    // 取消按钮
    cancel() {
      this.open = false;
      this.reset();
    },
    // 表单重置
    reset() {
      this.form = {
        picId: null,
        factoryId: null,
        productCode: null,
        productName: null,
        lineCode: null,
        lineName: null,
        childprocessId: null,
        childprocessCode: null,
        childprocessName: null,
        attr1: null,
        attr2: null,
        attr3: null,
        attr4: null,
        createBy: null,
        createTime: null,
        updateBy: null,
        updateTime: null
      };
      this.resetForm("form");
      this.tableData = [];
      this.nextID=1;
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.queryParams.pageNum = 1;
      this.getList();
    },
    /** 重置按钮操作 */
    resetQuery() {
      this.resetForm("queryForm");
      this.handleQuery();
    },
    // 多选框选中数据
    handleSelectionChange(selection) {
      this.ids = selection.map(item => item.picId)
      this.single = selection.length !== 1
      this.multiple = !selection.length
    },

    /** 导出按钮操作 */
    handleExport() {
      this.download('energy/report/analysis/orderenergy/export', {
        ...this.queryParams
      }, `单耗分析_${new Date().getTime()}.xlsx`)
    }
  }
};
</script>
